EV14 Injector, 714cc (12.0 Ohm, Bosch 0280158112)

Maximum flow rate of approximately 714cc @ 3 bar Short type injector (O-ring spacing is 34 mm)

Compatible with E85 and gasoline, O-rings compatible with ethanol and gasoline

Jetronic (EV1) type connector

High durability

10-hole nozzle

Conical type injector

The post EV14 Injector, 714cc (12.0 Ohm, Bosch 0280158112) appeared first on TuunerStuudio.