Injector EV14, 530cc (12.0 Ohm)

Maximum flow rate approx. 530cc @ 3 bar

Long type injector (O-ring spacing is 61 mm), replaces long injectors

Compatible with E85 and gasoline, 14 mm O-rings, compatible with ethanol and gasoline

USCAR type connector

High durability

6-hole spray tip

Split type injector

The post Injector EV14, 530cc (12.0 Ohm) appeared first on TuunerStuudio.