EV14 Injector, 714cc

Maximum flow rate about 714cc @ 3 bar

Medium-length injector (O-ring spacing is 49 mm) replaces medium injector

Compatible with E85/RE85 and gasoline O-rings compatible with ethanol and gasoline

Nippon Denso (ND) type connector

High resistance

9-hole nozzle

Conical type injector

The post EV14 Injector, 714cc appeared first on TuunerStuudio.