Injector EV14, 590cc (12.0 Ohm)

Maximum flow rate approx. 600cc @ 3 bar

Short type injector (O-ring spacing is 34 mm) replaces short injector

Compatible with E85 and gasoline 14 mm O-rings

Jetronic (EV1) type connector

High durability

Modified, new Bosch EV14 injector, "ball-seat" type nozzle

Conical type injector

The post Injector EV14, 590cc (12.0 Ohm) appeared first on TuunerStuudio.