EV14 Injector, 550cc (12.0 Ohm)

Maximum flow rate approximately 550cc @ 3 bar

Medium-length injector (O-ring gap is 49 mm), replaces medium-length injector

Compatible with E85 and gasoline, 14 mm O-rings

Jetronic (EV1) type connector

High durability

Modified, new Bosch EV14 injector

Conical type injector

The post EV14 Injector, 550cc (12.0 Ohm) appeared first on TuunerStuudio.