Injector EV14, 720cc (12.0 Ohm, Short)

Maximum flow rate approx. 720cc @ 3 bar

Short type injector (O-ring distance 34 mm), long nozzle

Compatible with E85 and gasoline

Two 11 mm O-rings on top

16 mm seal on the bottom

Jetronic (EV1) type connector

High durability

Modified, new Bosch EV14 injector with "ball seat" nozzle type

Conical type injector

The post Injector EV14, 720cc (12.0 Ohm, Short) appeared first on TuunerStuudio.