EV14 Injector, 580cc (12.0 Ohm)

EV14, 12 ohm, 580cc, C15, Jetronic, O-O 61 mm, total length 77 mm

The post EV14 Injector, 580cc (12.0 Ohm) appeared first on TuunerStuudio.