EV14 Injector, 613cc (12.0 Ohm, Bosch 0280158123)

Maximum flow rate approx. 613cc @ 3 bar

Medium-length injector (O-ring spacing is 49 mm), long spray nozzle

Compatible with E85 and gasoline, 14 mm O-rings

Jetronic (EV1) type connector

High durability

6-hole spray nozzle

Split-type injector

The post EV14 Injector, 613cc (12.0 Ohm, Bosch 0280158123) appeared first on TuunerStuudio.